-- Verify numerus:contact_web on pg

begin;

select contact_id
     , uri
from numerus.contact_web
where false;

select 1 / count(*) from pg_class where oid = 'numerus.contact_web'::regclass and relrowsecurity;
select 1 / count(*) from pg_policy where polname = 'company_policy' and polrelid = 'numerus.contact_web'::regclass;

rollback;
