-- Verify numerus:contact_swift on pg

begin;

select contact_id
     , bic
from numerus.contact_swift
where false;

select 1 / count(*) from pg_class where oid = 'numerus.contact_swift'::regclass and relrowsecurity;
select 1 / count(*) from pg_policy where polname = 'company_policy' and polrelid = 'numerus.contact_swift'::regclass;

rollback;
